270˚

272˚

272˚

274˚

274˚

276˚

276˚

278˚

278˚

280˚

280˚

282˚

282˚

284˚

284˚

286˚

286˚

288˚

28˚

28˚

30˚

30˚

32˚

32˚

34˚

34˚

36˚

36˚

38˚

38˚

40˚

40˚

42˚

42˚

0 500 km GMT Jul 31 09:14 Charlotte NC PSHA 0.2 sec SA (0.356 g), radius=800 km to include NMSZ. log(SA) unrestricted. View from South. hmax=8.63*10**-6 Cities: yellow circles

5.05.55.86.16.46.77.28.0M

Charlotte NC Disaggregated Seismic Hazard for 0.2 sec Spectral Accel., 0.356 g

PE = 2% per 50 yr. Hazard radius 800 km, DeltaD=10 km Mw: average, weighed by exceedance rates